/*
 Navicat Premium Data Transfer

 Source Server         : ryx
 Source Server Type    : MariaDB
 Source Server Version : 100510
 Source Host           : localhost:3307
 Source Schema         : c5_labsci

 Target Server Type    : MariaDB
 Target Server Version : 100510
 File Encoding         : 65001

 Date: 05/03/2026 12:14:29
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for lab_projectmember
-- ----------------------------
DROP TABLE IF EXISTS `lab_projectmember`;
CREATE TABLE `lab_projectmember`  (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `pid` bigint(20) NOT NULL COMMENT '项目ID,关联lab_rproject.id',
  `uid` bigint(20) NOT NULL COMMENT '成员ID,关联lab_user.id',
  `prole` int(11) NULL DEFAULT NULL COMMENT '角色,cata',
  `ctime` bigint(20) NOT NULL COMMENT '加入时间戳',
  `utime` bigint(20) NOT NULL COMMENT '更新时间戳',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_pid_uid`(`pid`, `uid`) USING BTREE,
  INDEX `idx_pid`(`pid`) USING BTREE,
  INDEX `idx_uid`(`uid`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 51 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '项目成员关联表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
